<template>
  <!-- 引用次数 -->
  <el-dialog custom-class="refresh-setting-dialog"
    :title="$t('SystemManage.DataRefresh.table_reference_count')"
    :visible.sync="show"
    :close-on-click-modal="false"
    :modal-append-to-body="false"
    @close="closeDia"
    top="5vh"
    width="760px"
    v-dialogDrag
    center
  >
    <el-table :data="dataList" border max-height="600px">
      <el-table-column align="center" prop="RelationTime" :label="$t('SystemManage.DataRefresh.reference_time')">
          <template slot-scope="scope">
            {{scope.row.RelationTime}}
          </template>
      </el-table-column>
      <el-table-column align="center" prop="ReferObjectTypeName" :label="$t('SystemManage.DataRefresh.reference_source')">
          <template slot-scope="scope">
            {{scope.row.ReferObjectTypeName}}
          </template>
      </el-table-column>
      <el-table-column align="center" prop="ReferObjectName" :label="$t('SystemManage.DataRefresh.reference_chart_table')">
          <template slot-scope="scope">
            {{scope.row.ReferObjectName}}
          </template>
      </el-table-column>
    </el-table>
    <!-- 弹窗按钮 -->
    <div class="dialog-btn">
        <el-button type="primary" @click="$emit('update:show',false)" style="width: 120px;">{{$t('Dialog.known')}}</el-button>
    </div>
  </el-dialog>
</template>

<script>
  export default {
    name:'referenceCountDia',
    props:{
      show:{
        type:Boolean,
        default:false
      },
      dataList:{
        type:Array,
        default:()=>[]
      }
    },
    methods:{
      closeDia(){
        this.$emit('update:show',false)
      }
    }
  }
</script>

<style lang="scss" scoped>

.rule-container{
    padding-left: 55px;
    .rule-item{
      display: flex;
      align-items: center;
      margin-bottom: 20px
    }
  }
  .dialog-btn{
    padding: 40px 0 30px 0;
    display: flex;
    justify-content: center
  }
</style>